/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;
DROP TABLE IF EXISTS `uptime`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `uptime` 
(
  `realmid` int(10) unsigned NOT NULL,
  `starttime` int(10) unsigned NOT NULL DEFAULT 0,
  `uptime` int(10) unsigned NOT NULL DEFAULT 0,
  `maxplayers` smallint(5) unsigned NOT NULL DEFAULT 0,
  `revision` varchar(255) NOT NULL DEFAULT 'AzerothCore',
  PRIMARY KEY (`realmid`,`starttime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='Uptime system';
/*!40101 SET character_set_client = @saved_cs_client */;

LOCK TABLES `uptime` WRITE;
/*!40000 ALTER TABLE `uptime` DISABLE KEYS */;
INSERT INTO `uptime` VALUES 
(1,1550400304,121,0,'AzerothCore rev. 2bcedc2859e7 2019-02-17 10:04:09 +0100 (master branch) (Unix, Debug)'),
(1,1550400454,1440,0,'AzerothCore rev. 2bcedc2859e7 2019-02-17 10:04:09 +0100 (master branch) (Unix, Debug)');
/*!40000 ALTER TABLE `uptime` ENABLE KEYS */;
UNLOCK TABLES;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

